f c:\tiga\tigacd.exe ^tigaerr
f c:\tiga\tigaemu.rlm ^tigaerr
T0 TIGA Symphony (Release 2.0) Installation 
dis
j ^top

^hnotf
z
|
|Invalid drive and directory specification
!Hit any key to return.

^top
z
|
|Type the drive and directory where Symphony has been installed.
|
=3C:\SYMPHONY
@3The drive and directory: 
e %3 esc ^hnotf
e "%3" "" ^top
f %3\install.exe ^hnotf
f %3\symphony.exe ^hnotf
z
|
|Installing...  TIGA Symphony Driver from %s
c %s\symphony\*.drv %3 ^errend
d %3\single.lbr ^errok
^errok
z
|
|This concludes the installation of TIGA Symphony Driver.
|To run Symphony with EIZO TIGA driver properly, follow as below.
|
|  1. Execute the TIGA graphics interface program (TIGACD.EXE) with the
|     video mode you wish.
|  2. Run INSTALL program from the directory %3.
|  3. Select Advanced Options from the MAIN MENU.
|  4. Select Add New Drivers to Library from the ADVANCED OPTIONS.
|  5. Select Modify Current Driver Set form the ADVANCED OPTIONS.
|  6. Select Text Display.
|  7. Select EIZO TIGA Symphony Text Driver.
|  8. Select Graph Display.
|  9. Select EIZO TIGA Symphony Graphics Driver.
| 10. Save Changes and Exit Install Program
|
|Refer to the TIGA Installation Manual for detail.
|
b
^errend
|
|Error occurred.
|Please reinstall.
b
^tigaerr
z
|
|Unable to find EIZO TIGA Communications Driver (TIGACD.EXE) in the C:\TIGA.
|Please install TIGA system first.
b
