  Reports:

      System Information - This report outputs all information
  generated by each of the SysInfo menu selections.


      This report is output to the device that is currently
  selected as the Error Log destination.  If no error log
  destination has been selected, a pop-up menu will prompt the
  user to choose a destination for the report.  When a file is
  specified as the destination device, the following file names
  will be writted to the default drive:

          ┌───────────────────────┬─────────────┐
          │  Report               │ FileName    │
          ├───────────────────────┼─────────────┤
          │  System Information   │ QA_SYS.TXT  │
          └───────────────────────┴─────────────┘

