CONTENT FOR HELP

 Radio

 Hardware Requirement

 Features

 Radio Control Panel

 Key Functions


Requirements
 HardWare Requirement

To make sure that Radio works optimally , you need to have at least the following hardware :

 AT286 or above system running under Window 3.0 or above

1MB on-Board RAM

 VGA Monitor

 Radio Card

 Stereo Speakers

  Antenna


 Features

FM Radio

Autoscan Tuning

Manual Tuning

Preset Tuning (Up to 99 stations)

Alarm Function

Sleep Function

Clock Display

Recording


Control Panel
Radio Control Panel


 Key Functions

Button	Description	Function	Key
	Power On/Off	Off the radio	Q
	Help	Goto the help screen	H
	Fine Tune Set Alarm Min	Increase/decrease the tuning frequency by 0.025 MHz. Increase/decrease the minute setting of Alarm.	left/ right arrow
	Tune Up/Down Set Alarm Hour Set Slumer time	Increase/decrease the tuning frequency by 0.1 MHz.Increment/decrease the hour setting of Alarm Increment/decrease the minute setting of Slumber	up/ down arrow
	Scan	Used to set the radio into scan mode, i.e searching to the next station.
	Vol Up/Down	Increase/Decrease Volume	+/-
	Mute	Off the sound	M
	Sleep	Radio is mute after the predefined time  (in minutes)
	Alarm On	Radio is on at the predefined time	A
	Recording	Manual/Automatic Recording and playback
	Stations 1-99	Tune to any of the 99 predefine channel	0-9
	Memory Preset	Save the current frequency setting to one of the 10 preset station.	P
	Resize button	Click to resize the panel
	Product Logo	Click the logo would iconize the panel
		Set Radio Panel to be always on Top	T
		Set Radio Panel to normal mode (not always on Top)	N


Recording

Manual Record

-	Press [image]. The dialog box shown above will apppear.

-	Press Record! to close the dialog box and start recording now.

-	Press [image] again to stop recording. The recorded data will be saved to a default

file named c:\test.wav. You may change the default filename using Save As

button.

-	The recorded data is in 8-bit stereo format. You may choose the sampling rate by

pressing RecOptions.

Automatic Record

-	Set the record time, duration and the station to record.

-	Click OK.

-	When recording starts, you may stop the recording anytime by pressing [image]. It

will also stop automatically when the specified duration is up.


Sleep Function

Activating The Function :

-	The function can be activated by pressing the 'Sleep' button ['l' key].

-	Once activated, the count down time and the preset sleep time in minutes will be

displayed. The preset time is displayed on the left.

-	The display switches back to frequency display after a lapse of about 4 seconds or

when any button besides minute setting button is pressed.

Setting The Time :

-	Use the 'tune' button [Up or Down key]  to change the preset sleep time. Both

count down time and preset time will be adjusted. The sleep time can be in the

range 1-59 minutes.

-	After the sleep function is activated, you may change the sleep time by

repeating the steps described above.

-	You may check the remaining time that the radio will go into sleep by pressing

the 'sleep' button. Do not click the 'tune' button as this would reset the

slumber time.

-	On time up, the radio and the sleep on indicator will be turned off.

Deactivating The Function :

-	To deactivate timer,  set the sleep time to zero and the timer on

indicator will  turn off.


Alarm Function

Activating The Alarm :

-	Press the 'Alarm' button ['a' key] to turn on the alarm. The alarm indicator on the

display will turn on.

-	The display will show the preset alarm time.

Setting The Alarm :

-	When the preset alarm time is shown, press the 'tune' button [up or down key] to

change the hour setting or 'fine tune' button [Left or Right key] to change the

minute setting.

-	The display switches back to frequency display after a lapse of about 4 seconds or

when any button besides the hour and minute setting button is pressed.

-	On time up, the radio will be turned on and  tuned to the last set station. The alarm

on indicator will be turned off.


10 Preset Stations

-	Tune to the desired station using Autoscan or Manual tuning.

-	Press 'mem' button follow by any preset button 1 - 10. Clicking elsewhere will

disable this function. After preseting the buttons, you may then press the preset

buttons to tune to the predefined channel.


Autoscan

-	Press the 'scan' button to start autoscan mode. The radio will automatically seek to

the next available station and stop scanning.

-	The display will show that the radio is TUNED.


Manual Tuning

-	Use the 'Tune' button to adjust the frequency by 0.1 MHz. Use the 'fine' button if

fine tuning is required. Fine tune adjust the frequency by 0.025MHz.

-	Stop tunning when the display show that the radio is TUNED.