
This file contains important informations about the Mouse Control Center.

   a.Swap Right / Left Buttons
       You can check this box to swap the function of the left and right mouse
     button. The diagram on the right hand corner indicates whether the current
     hand mode is the left hand or right hand mode.

       After swapping, you can click on the "Test" button to test if the
     selected hand mode is what you want.

   b.Acceleration
       This option allows you to accelerate your cursor as you move your mouse.
     Options provided are: Slow, Moderate, Fast, and Off.

   c.Color
       This item determines the color of the cursor. Two options are provided:
     Normal and Reverse.


   d.Sensitivity
       Sensitivity is the ratio of actual mouse movement to cursor movement.
     You can use this option to set how fast or slow the cursor moves on the
     screen as you move your mouse.

   e.Reset
       You can check MS Mode if you want to use a 2-button mouse, check PC Mode
     if you want to use a 3-button mouse.

       Clicking the Reset button returns all the current settings you have made
     inside the "Mouse Control Center" dialog box to their default settings.
     The following is a list of all the default settings:

    Mouse Mode                    :MS Mode
    Swap Right / Left Buttons     :Right-handed
    Acceleration                  :Off
    Color                         :Normal
    Sensitivity                   :Medium

   f.Help
       Clicking on the Help button calls up a help file which provides brief
    descriptions on the features, functions, and dialog boxes of the
    mouse.
