; Assembler source library
; Copyright (c) 2002 Arkady Belousov <ark@mos.ru>
;
; This library is free software; you can redistribute it and/or modify it
; under the terms of the GNU Lesser General Public License as published by
; the Free Software Foundation; either version 2.1 of the License, or (at
; your option) any later version.
;
; This library is distributed in the hope that it will be useful,
; but WITHOUT ANY WARRANTY; without even the implied warranty of
; MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
; GNU Lesser General Public License for more details.
;
; You should have received a copy of the GNU Lesser General Public
; License along with this library; if not, write to the Free Software
; Foundation, Inc., 59 Temple Place, Suite 330, Boston, MA  02111-1307  USA
;

MCB		segment use16 para at 0
MCB_ID		db ?		; 0: 'M'=valid, 'Z'=last block in list
ownerID		dw ?		; 1: PSP seg of owner (0=free) or special flag
			; (6=DR-DOS XMS UMB, 7=DR-DOS excluded upper memory,
			; 8=belongs to DOS, 0xfffx=386MAX)
MCB_size	dw ?		; 3: size in paragraphs (without MCB itself)
		db 3 dup(?)
ownername	db 8 dup(?)
MCB		ends		; sizeof(MCB) == 16
